- 1 -

Hello, world! This paragraph is probably not indented.

But this one is, by mm’s default. But we’re going to change the indentation to 1.27c (centimeters). Let’s see how well that worked.

Not well! What if we convert centimeters to ens in a temporary register? How’s that for indentation? How’s this for indentation (back at the default)? They look the same because 1.27 cm = (2.54 / 2) cm. 2.54 cm is one inch. That is in fact the definition of the inch. The default paragraph indentation in mm (and in much other U.S. formal writing) is one half inch—or 1.27 cm.