\documentclass{article} 
\usepackage{html} 
\begin{document}
\section{Bug report: HTMLcode converts Filenames to Lowercase}
In the following construct  using the macro {\bf HTMLcode} the uppercase 
``MO'' is converted to lowercase in the filename MO.txt.

{\HTMLcode[../wdr/general/proj/MO.txt,target=outer]{A}{{Confirmation Note}}}

However, the macro {\bf htmladdnormallink} leaves the uppercase charqacters in the filename correctly as they are:

\htmladdnormallink{Confirmation Note by MO5, dated Nov. 6, 1998}{../wdr/general/proj/MO.txt}

Zurich, Jan. 18, 1999

Walter.Gull@ubs.com

\end{document}
