%Time-stamp: <1998-08-02 1928 ketil>
%
% Default setup for (solo) guitar
% The default page size is a4 with really small margins
\voffset=-38.00mm \vsize=278mm% top margin,  page length
\hoffset=-15.40mm \hsize=190mm% left margin, page width 
%
% Bar number at the beginning of every line
\systemnumbers
%
%\def\TabRevDate{\number\day.\number\month.\number\year}
\def\TabCopyright{\copyright \number\year, Ketil.Mehl@usa.net}
\def\TabProvisions{Non-commercial copying welcome}
%
%\raggedbottom         % Compact on top, uneven bottom line
\normalbottom         % Vertical and bottom centered on the page
\instrumentnumber{1}  % number of instruments....
\setclef{1}{0}        % noted in G clef, one staff line
\smallaccid           % Use small accidentals
\parindent 10mm       % Indententation in mm on the first staff line
\musicsize=20\relax   % \musicsize=16 is also possible
\transpose=0          % Default to no transposition
\def\freqbarno{1}     % Number every bar. Override by \def\freqbarno{99}, i.e. no numbers
                      % on the bars, or \nobarnumbers; no numbers even above the clef sign
\mulooseness=0        % The overall ``tightness'' of the score, higher number gives
		      % greater distance between the notes
