%%%%%%%%%%%%%%%%%
%
% xxx.tex
%
%%%%%%%%%%%%%%%%
\input musixtex
\input pmx
\setmaxslurs{24}\setmaxinstruments{24}%
\normalmusicsize%
\nopagenumbers
\tracingstats=2\relax
\hsize=170pt
\vsize740pt
\def\nbinstruments{1}
\setstaffs11
\setclef10
\setname1{ }
\generalsignature{ 0}%
\generalmeter\meterC%
\parindent 0pt
\elemskip1pt\afterruleskip1.000pt\beforeruleskip0pt\relax
\stafftopmarg0pt\staffbotmarg5\Interligne\interstaff{10}\relax
\nostartrule
\readmod{xxx}
\startmuflex\startpiece\addspace\afterruleskip%
\znotes\zcharnote{16}{\titles{2.0}{}{0}{}{0}{}{0}}\en%
% Bar count 1
\pnotes{1.63}\xnum{1.63}{`g}3\ibu1{'c}1\qb1c\tbu1\qb1d\ds%
\xnum{1.63}{''''b}3\ibu1e1\qb1e\tbu1\qb1f\ds\en%
\pnotes{4.00}\hu c\en%
\Endpiece
\vfill\eject\endmuflex
\bye
